SiS PCI Fast Ethernet Adapter

Use this dialog box to configure the medium connection and Network Address for SiS PCI Fast Ethernet adapter.

Media Type

Auto-detect

100BaseTx

100BaseTx Full-Duplex

10BaseT

10BaseT Full-Duplex

NetworkAddress


Auto-detect
Autosense the media ports supported by the adapter and dynamically switch to the live media.


100BaseTx
Select the Fast Ethernet 100BaseTx medium connection (RJ connector).


100BaseTx Full-Duplex
Select the Fast Ethernet 100BaseTx Full-Duplex medium connection (RJ connector).


10BaseT
Select the 10BaseT medium connection (RJ connector).


10BaseT Full-Duplex
Select the 10BaseT Full-Duplex medium connection (RJ connector).


Network Address
Override the adapter’s Ethernet address.

Unless necessary, do NOT modify this field and let the system use the default Ethernet address contained in the serial ROM on the adapter.